% Terminator exposure table to be included in the CO manual and the 
% CO checksheet.
% IMPORTANT:  If you modify this file, rerun latex and dvips on the
% CO handbook and the CO checklist.
%
% T. Metcalf  1997-Mar-03
% H. Hudson   1999-Feb-09

\begin{verbatim}

TERMINATOR EXPOSURES

Filter   Exposure    w/NuDen
----------------------------
Al01        21        17
Mg3         23        17
Be          23        18
AlMg        25        18
Al12        25        18

\end{verbatim}
