A list of the most of the computer nodes which have the Yohkoh software
is listed here.  To verify that the lists are accurate, we recommend 
logging into sxt, isass0 or flare2 and looking at the file {\tt /etc/hosts}.
\index{network addresses}
\index{addresses, network}
\index{node numbers, addresses}

\begin{verbatim}
           DECNET             Internet                          Machine

SAG      24.131   192.68.162.134 (sag.space.lockheed.com)   DEC-VMS
SXT      24.134   192.68.162.107 (sxt.space.lockheed.com)   SGI-Unix
SXT1     24.362   192.68.162.100 (sxt1.space.lockheed.com)  DEC-Ultrix
SXT2     24.365   192.68.162.109 (sxt2.space.lockheed.com)  DEC-Ultrix
SXT3     24.366   192.68.162.110 (sxt3.space.lockheed.com)  DEC-Ultrix
SXT4              192.31.215.58  (sxt4.oscs.montana.edu)    DEC-Ultrix
SXT6              192.68.162.158 (sxt6.space.lockheed.com)  DEC-Ultrix

spot              133.40.2.120 (spot.mtk.nao.ac.jp)         SUN
neptune           133.11.3.23  (neptune.astron.s.u-tokyo.ac.jp) SUN

ISASS0   40.932   133.74.8.100 (isass0.solar.isas.ac.jp)    DEC-Ultrix
ISASS1   40.933   133.74.8.101 (isass1.solar.isas.ac.jp)    DEC-Ultrix
ISASS2   40.934   133.74.8.102 (isass2.solar.isas.ac.jp)    DEC-Ultrix
ISASS3   40.935   133.74.8.103 (isass3.solar.isas.ac.jp)    DEC-Ultrix
ISASS4   40.936   133.74.8.104 (isass4.solar.isas.ac.jp)    DEC-Ultrix
ISASS6            133.74.8.106 (isass6.solar.isas.ac.jp)    SUN

ISASXA   40.927   133.74.8.110 (isasxa.solar.isas.ac.jp)    DEC-VMS
ISASXB   40.928                                             DEC-VMS
ISASXC   40.929                                             DEC-VMS

FLARE1            133.74.8.1   (flare1.solar.isas.ac.jp)    SUN
FLARE2            133.74.8.7   (flare2.solar.isas.ac.jp)    SUN
FLARE3            133.74.8.3   (flare3.solar.isas.ac.jp)    SUN
FLARE4            133.74.8.4   (flare4.solar.isas.ac.jp)    SUN
FLARE5            133.74.12.94                              SUN
FLARE6            133.74.8.6   (flare6.solar.isas.ac.jp)    SUN
FLARE7            133.74.8.87  (flare7.solar.isas.ac.jp)    MIPS
FLARE8            133.74.8.88  (flare8.solar.isas.ac.jp)    MIPS
FLARE9            133.74.8.89  (flare9.solar.isas.ac.jp)    MIPS
FLARE10           133.74.8.90  (flare10.solar.isas.ac.jp)   MIPS
FLARE11           133.74.8.91  (flare11.solar.isas.ac.jp)   MIPS
FLARE12           133.74.8.92  (flare12.solar.isas.ac.jp)   MIPS
FLARE13           133.74.8.93  (flare13.solar.isas.ac.jp)   MIPS
FLARE14           133.74.8.94  (flare14.solar.isas.ac.jp)   MIPS
FLARE15           133.74.8.95  (flare15.solar.isas.ac.jp)   MIPS

MSSL     19.253                                             DEC-VMS
MSSLV1            128.40.70.62 (msslv1.mssl.ucl.ac.uk)      VMS-4000
MSSLV2            128.40.70.63 (msslv2.mssl.ucl.ac.uk)      VMS-4000
MSSLVB            128.40.70.70 (msslvb.mssl.ucl.ac.uk)      VMS-3100
MSSLA1            128.40.70.58 (mssla1.mssl.ucl.ac.uk)      VMS-3000

ssd0              128.60.8.1    (ssd0.nrl.navy.mil)         VAX
aspen             128.60.8.72   (aspen.nrl.navy.mil)        SUN
dogwood           128.60.108.102 (dogwood.nrl.navy.mil)     SUN
sola              128.60.8.41   (sola.nrl.navy.mil)         SUN
solb              128.60.8.42   (solb.nrl.navy.mil)         SUN
nessie            146.229.9.11  (nessie.optics.uah.edu)     SUN
koa               128.171.167.1 (koa.ifa.hawaii.edu)        SUN?
mamane            128.171.2.2   (mamane.ifa.hawaii.edu)     SUN
sunspot                         (sunspot.ssl.berkeley.edu)  SUN?
star              36.10.0.5     (star.stanford.edu)         ???
flare             36.14.0.166   (flare.stanford.edu)        DEC-Ultrix
panache           36.14.0.51    (panache.stanford.edu)      DEC-Ultrix
ogwl                            (ogwl.se.shibaura-it.ac.jp) ???
setp4ku                         (step4ku.kugi.kyoto-u.ac.jp) SUN

riker                           (riker.hao.ucar.edu)        SGI
darmok                          (darmok.harvard.edu)        ???
astro                           (astro.glasgow.ac.uk)       ???
sundog   14.905   131.215.139.154 (sundog.caltech.edu)      VMS
umbra             128.183.57.24 (UMBRA.gsfc.nasa.gov)       DEC-Ultrix

NOTE: To go from DECNET xx.yyy convention to the single node number
notation, take the xx portion, multiply by 1024, and add `yyy'.  
So SAG becomes 24*1024 + 131 = 24707:: 
\end{verbatim}

