\input guide_common0.tex		% definition of new commands

%
\guidetitlepage{Yohkoh Analysis Guide}{Instrument Manual}{~}
{Ver 1.06~~Ed: M.D.~Morrison~~6-Nov-92\\
Ver 2.00~~Ed: M.D.~Morrison~25-Jan-94\\
Ver 2.91~~Ed: R.D.~Bentley~~4-Oct-2004\\
Ver 2.92~~Ed: A.~Takeda(Yohkoh Legacy data Archive)~~date below}
{}

%
%------------------------------------------------------------------------------
\begin{rawhtml}
<!www---CONTENTS-------><p><hr>
\end{rawhtml}

\input guide_common11.tex		% contents, etc.


%------------------------------------------------------------------------
\begin{rawhtml}
<!www---MANUAL-------><p><hr>
\end{rawhtml}
\newpage 
\label{Introduction}
\input iguide_intro_inst.tex     % \section{Introduction to the Yohkoh Instruments}


%------------------------------------------------------------------------
\begin{rawhtml}
<!www----------><p><hr>
\end{rawhtml}
\newpage 
\label{BCS}
\input iguide_bcs.tex            % \section{Bragg Crystal Spectrometer (BCS)}


%------------------------------------------------------------------------
\begin{rawhtml}
<!www----------><p><hr>
\end{rawhtml}
\newpage
\label{HXT}
\input iguide_hxt.tex            % \section{Hard X-Ray Telescope (HXT)}


%------------------------------------------------------------------------
\begin{rawhtml}
<!www----------><p><hr>
\end{rawhtml}
\newpage
\label{SXT}
\input iguide_sxt.tex            % \section{Soft X-Ray Telescope (SXT)}


%------------------------------------------------------------------------
\begin{rawhtml}
<!www----------><p><hr>
\end{rawhtml}
\newpage
\label{WBS}
\input iguide_wbs.tex            % \section{Wide Band Spectrometer (WBS)}


%------------------------------------------------------------------------
\begin{rawhtml}
<!www----------><p><hr>
\end{rawhtml}
\newpage
\label{ACS}
\input iguide_acs.tex            % \section{Attitude Control System (ACS)}

%
%------------------------------------------------------------------------
\appendix
\begin{rawhtml}
<!www---APPENDIX-------><p><hr>
\end{rawhtml}
\addtocontents{toc}{\protect\vspace{0.2cm}}
\newpage 
\label{Append-time}
\input iguide_time.tex           % \section{Details on the Time Tags on the Data}\index{time tags}


%------------------------------------------------------------------------
\begin{rawhtml}
<p><hr>
\end{rawhtml}
\newpage
\label{Append-sxtpix}
\input iguide_sxt_pixel.tex      % \section{Details of the SXT CCD Pixels}


%------------------------------------------------------------------------
\begin{rawhtml}
<p><hr>
\end{rawhtml}
\newpage
\label{Append-sxtdates}
\input iguide_sxt_dates.tex      % \section{Dates of Significant SXT Activities}


%------------------------------------------------------------------------
\begin{rawhtml}
<p><hr>
\end{rawhtml}
\newpage
\label{Append-acs}
\input iguide_acs_dates.tex      % \section{Attitude Control System (ACS) Related Items}


%------------------------------------------------------------------------
\begin{rawhtml}
<p><hr>
\end{rawhtml}
\newpage
\label{Append-misc}
\input iguide_yohkoh_misc.tex    % \section{Miscellaneous Yohkoh Information}


%---------------------------------------------------------------------$
\begin{rawhtml}
<p><hr>
\end{rawhtml}
\newpage 
\input yag_manual.tex           % Web Version...


%------------------------------------------------------------------------
%%\newpage
\begin{rawhtml}
<!www---INDEX-------><p><hr>
\end{rawhtml}
%%tth:\printindex


%------------------------------------------------------------------------
\begin{rawhtml}
<!www----------><p><hr>
\end{rawhtml}

\end{document}

