\insertplot{fig_sxt_resp.eps}{
The total SXT signal as a function of $\log_{10}(T_e)$ for the
open filter and the analysis filters as indicated.  NOTE: Be and Al12
are mistakenly reversed in Tsuneta {\it et al.}, (1991).
}{fig_sxt_resp}{6}{6.66}
